% Die längste Abkürzung kann in die eckigen Klammern
% bei \begin{acronym} geschrieben, um einen hässlichen
% Umbruch zu verhindern
%
% ACHTUNG: Sie müssen die Abkürzungen von Hand alphabetisch
%          sortieren. Das passiert nicht automatisch.
\begin{acronym}[IEEE]
  \acro{ANS}{Arithmetic Numeral System}
  \acro{ASCII}{American Standard Code for Information Interchange}
  \acro{CABAC}{Context-Adaptive Arithmetic Coding}
  \acro{CRAM}{Compressed Reference-oriented Alignment Map}
  \acro{DNA}{Deoxyribonucleic Acid}
  \acro{EOF}{End of File}
  \acro{GA4GH}{Global Alliance for Genomics and Health}
  \acro{IUPAC}{International Union of Pure and Applied Chemistry}
  \acro{LZ77}{Lempel Ziv 77}
  \acro{SAM}{Sequence Alignment Map}
  \acro{BAM}{Binary Alignment Map}
\end{acronym}
