% Die längste Abkürzung kann in die eckigen Klammern
% bei \begin{acronym} geschrieben, um einen hässlichen
% Umbruch zu verhindern
%
% ACHTUNG: Sie müssen die Abkürzungen von Hand alphabetisch
%          sortieren. Das passiert nicht automatisch.
\begin{acronym}[IEEE]
  \acro{DNA}{Deoxyribonucleic acid}
  \acro{ANS}{Arithmetic numeral system}
\end{acronym}
